         180           8
   4.57386155554582        3.81719318850618        3.07361712639550     
   2.36479669714533        1.61203505796389       0.883682661020460     
  0.251668230270750      -0.367732333060072     
  -2.05678063260931       -2.17010922840825       -2.28708285430035     
  -2.47365904522012       -2.73927084092767       -2.90081040518825     
  -3.04997733574420       -3.18694159585090     
 -8.803176820332107E-003  0.000000000000000E+000
   1.00992850087525       0.000000000000000E+000
   1.01400712149546       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
