         180           8
   3.89372334003331        3.12906739698738        2.44541573610273     
   1.67964224651300       0.898390557075310       0.170413676356667     
 -0.455425958845255       -1.10530400516224     
 -8.917125164245904E-002 -0.814324359380992      -0.971569044853873     
  -1.21608205592579       -1.58492823665032       -1.94048883642168     
  -2.25598530664789       -2.63940380606087     
 -8.795397232859299E-003  0.000000000000000E+000
   1.00992229570509       0.000000000000000E+000
   1.01422942037410       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
