         180           8
   12.2860761035070        11.2674227825192        10.2557826999121     
   9.39642769399224        8.73769892891062        8.19501320958628     
   7.69947056218951        7.05041730550487     
 -0.910540838819417      -8.955679989004194E-002 -0.813685155749485     
  -1.07911246681259       -1.50708144161015       -1.86056552241476     
  -2.19770557085580       -2.13115723812525     
  1.001196973983350E-003  0.000000000000000E+000
  0.987041634592408       0.000000000000000E+000
  0.984352679950541       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
