         180           8
   1.75954948015396       0.792791996081975       1.061044952506654E-002
 -0.792540736697166       -1.49826336068469       -2.13543615866405     
  -2.74041134900933       -3.27530837138993     
  0.411308406249634       0.794519746683211      -0.237706418852876     
 -0.664936002162636       -1.21158163679966       -1.69994864971051     
  -2.09347794560871       -2.07883356860028     
 -8.870438150714642E-003  0.000000000000000E+000
   1.01003620294786       0.000000000000000E+000
   1.01403538662347       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
