         180           8
 -0.613508813432423      -0.821220706960737       -1.06836608871328     
  -1.33619565174029       -1.57392417541301       -1.79788391409208     
  -1.90429205660254       -1.91974498604193     
  -3.60975714010149       -3.44434122714239       -3.14912478635360     
  -2.79920852208956       -2.58600169413185       -2.47053229449247     
  -2.18802287069502       -1.76152695774189     
 -8.708903166187151E-003  0.000000000000000E+000
   1.00958346865179       0.000000000000000E+000
   1.01406335456091       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
