         180           8
   2.36351920797119        1.60996099917862       0.947001729673542     
  0.304150889296942      -0.305552327528651      -0.911409244311472     
  -1.52394386997289       -2.07506709881432     
  -1.41649405684924       -1.69780079255048       -1.85542325021121     
  -2.08322739944748       -2.33774993369545       -2.48443219286276     
  -2.57746063792042       -2.45542635499017     
 -8.839116358019658E-003  0.000000000000000E+000
   1.00981751624483       0.000000000000000E+000
   1.01408738466832       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
