         180           8
   3.07519000394149        2.33066834260294        1.66372092103086     
   1.02359008817755       0.368399691813456      -0.300788343137143     
 -0.892953110718222       -1.39685948374411     
  -1.56363478770091       -1.69140426134998       -1.83408304785300     
  -2.13783512804361       -2.44730741740670       -2.65357327545716     
  -2.83976932361624       -2.90500293748509     
 -8.676381675517125E-003  0.000000000000000E+000
   1.00981588363996       0.000000000000000E+000
   1.01358659277631       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
