         180           8
   2.26303594846232        1.52998224422904       0.819932253852757     
  0.104755142727947      -0.586325574427633       -1.25723531707532     
  -1.87682263928988       -2.49852361748403     
  -2.51428222249183       -2.50394126027889       -2.59290418416334     
  -2.72686173030188       -2.84734113917872       -3.03262367107549     
  -3.20482240339141       -3.34451986898594     
 -8.285764882848237E-003  0.000000000000000E+000
   1.01013820123930       0.000000000000000E+000
   1.01360835819913       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
