         180           8
   2.22693405111191        1.53598291124833       0.814425465376999     
  0.134702381196335      -0.556360817859148       -1.25430966870476     
  -1.91204537050007       -2.47451491196137     
  -2.27363903139442       -2.29597116747346       -2.41117472507056     
  -2.59716798590592       -2.73838502648354       -2.85474545821229     
  -3.02390812417950       -3.26396571586980     
 -8.256430758040112E-003  0.000000000000000E+000
   1.00999377707547       0.000000000000000E+000
   1.01416038199217       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
