         180           3
   11.8358196453752        9.00774675968355        7.16567925012795     
  -1.03232514623001       -1.65018018428205       -2.28673520645130     
  9.490867541672900E-004  0.000000000000000E+000
  0.987086741942898       0.000000000000000E+000
  0.984503711716533       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
