         180           8
   3.29328898564271        2.52429375303465        1.79020770649172     
   1.03638774656408       0.219151879136212      -0.639239903556058     
  -1.35856326202387       -1.89409655605609     
  -3.11125735402549       -3.27067453238973       -3.33168563805159     
  -3.32602636649392       -3.39224142514530       -3.71149529139937     
  -3.98704744810975       -3.86718993122428     
 -8.169485493017414E-003  0.000000000000000E+000
   1.01015251912509       0.000000000000000E+000
   1.01411165080435       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
