         180           8
   4.38544384772835        3.99828322671716        3.42463209444453     
   2.69818898573034        1.98134510757186        1.27185219157700     
  0.574571223260056      -9.339234975541082E-002
  -3.58466353205032       -4.01340388014668       -3.86644036208352     
  -3.89142652513356       -4.02955848270342       -4.18531561601916     
  -4.35105934784693       -4.44548716082302     
 -8.078556559590104E-003  0.000000000000000E+000
   1.00942236824120       0.000000000000000E+000
   1.01395134154820       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
