         180           8
  0.628097997673709       0.447580894172504       0.332035965140035     
  0.240510199035040       6.520620880194528E-002 -0.122974117393156     
 -0.315931267126573      -0.495525665713637     
  -4.29632941447542       -4.18830723765296       -3.86300519676443     
  -3.56268925702976       -3.34239774345272       -3.13942680596139     
  -2.98348263164011       -2.75803321602745     
 -7.627174163075664E-003  0.000000000000000E+000
   1.00926767815489       0.000000000000000E+000
   1.01375722994123       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
