         180           8
   1.81028014098696        1.44506433512405        1.22706382308872     
   1.14130265996532        1.01619420364902       0.849612702558257     
  0.665537483929796       0.364657782303286     
  -4.69963399466244       -4.65261763677955       -4.48692068953135     
  -4.07678637174654       -3.74055533850792       -3.52785712459261     
  -3.26547247588782       -3.00121845548025     
 -7.617895728075971E-003  0.000000000000000E+000
   1.00939261028961       0.000000000000000E+000
   1.01385559927736       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
