         180           8
  -7.20164308986433       -7.21347092531561       -7.18639826861685     
  -7.01788896499964       -6.85084974306333       -6.78058726611686     
  -6.66254132616637       -6.56842131330788     
  -6.57753375514770       -6.65494769368382       -6.65702728584649     
  -6.48476463074452       -6.21915883654543       -6.05078480256973     
  -5.94250904343081       -5.96067146342054     
 -1.019575006414712E-002  0.000000000000000E+000
   1.00926779639828       0.000000000000000E+000
   1.01366057301845       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
