         180           8
  -5.76190708489126       -6.29181451074325       -6.50027069015278     
  -6.79846558340772       -7.00727025192454       -7.17430950120208     
  -7.35001782738258       -7.40199913578693     
  -6.69688173016109       -6.06053131324189       -5.94578776422099     
  -5.98433953530491       -5.95857314079048       -6.01568000625299     
  -6.16874103610056       -6.33014824445560     
 -1.028697371078257E-002  0.000000000000000E+000
   1.00975740972570       0.000000000000000E+000
   1.01395608937433       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
