         180           8
   1.12639964809336       0.667845469681811       0.173959876236079     
 -0.327457204051663      -0.836281255864555       -1.36530384315850     
  -1.86746440270796       -2.38931533926221     
  -7.08119994359848       -7.44490906836035       -7.35831261545580     
  -7.28842242988689       -7.24659714870986       -7.15816547751333     
  -7.19728682590388       -7.39955658249182     
 -9.899982647715591E-003  0.000000000000000E+000
   1.00994262395657       0.000000000000000E+000
   1.01445869629182       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
