         180           8
 -9.146432951732761E-002 -0.780872122562893       -1.29184965814354     
  -1.68900561987345       -2.13370459775158       -2.60023051358514     
  -3.04894220325075       -3.49731435285896     
  -2.90354931548016       -4.54264983485743       -5.81153806182019     
  -6.18918126338452       -6.33064244399764       -6.41768191730809     
  -6.37282411714514       -6.37806424514007     
 -9.960896761498479E-003  0.000000000000000E+000
   1.00995222648436       0.000000000000000E+000
   1.01461431026117       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
