         170           8
  -1.09489848260993       -1.21919397077171       -1.33174749353857     
  -1.37310257586312       -1.32863535945754       -1.27584400172566     
  -1.31858073625220       -1.40751323999067     
  -6.67406155276413       -6.61302477125321       -6.58057266901297     
  -6.47772530504771       -6.24275904222558       -6.00468433344319     
  -5.78494820210417       -5.57713551273022     
 -9.540747375996073E-003  0.000000000000000E+000
   1.00910431419998       0.000000000000000E+000
   1.01376157237403       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
