         180           8
  -1.15751297844374       -1.13294169678236       -1.28030804125371     
  -1.37439324672949       -1.42285760411162       -1.40817048236573     
  -1.22194121758100       -1.09590086794904     
  -7.14632266657988       -6.83785219554746       -6.58626432544730     
  -6.40600681834767       -6.52027952551564       -6.64651821384628     
  -6.44612478090943       -6.23689539922038     
 -9.563069572561958E-003  0.000000000000000E+000
   1.00932979979361       0.000000000000000E+000
   1.01419816002577       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
