         180           8
   12.2940702893556        11.8627057229359        11.4808216240793     
   11.0092403346819        10.6100982657199        10.2998092249443     
   9.91072239712133        9.46329701980722     
  -7.82793361196957       -8.53818060647372       -8.95664905860164     
  -9.32649525068810       -9.52680525368878       -9.55277511501912     
  -9.74869709058795       -11.0183102415164     
 -9.250065368677203E-003  0.000000000000000E+000
   1.00995486788411       0.000000000000000E+000
   1.01456910223617       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
