         180           8
   8.43237475193406        7.65985415686553        6.93281816183836     
   6.19731804308604        5.48430145550838        4.79311268462930     
   4.11268274883551        3.44179021176776     
  -4.24780297574436       -4.39676533457760       -4.47092357355802     
  -4.53155958669148       -4.62830182876575       -4.78838871591631     
  -4.89300282498596       -5.10806547525008     
 -9.185290594549299E-003  0.000000000000000E+000
   1.00918980471513       0.000000000000000E+000
   1.01356622761000       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
