         180           8
   14.4862410688433        13.7893551766299        12.7946046237720     
   11.9135993004452        11.0774944418634        10.9996698596877     
   12.8729527758379        12.1874078455233     
  -4.62547170614001       -5.19187211404921       -4.81431764956308     
  -4.64475559895862       -4.63233039540137       -5.07563229696818     
  -6.74831838389493       -7.21686546307805     
  1.251027387650434E-003  0.000000000000000E+000
  0.987587562874365       0.000000000000000E+000
  0.985270335754710       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
