         180           8
   7.03284595215747        6.29103962899204        5.53169098665972     
   4.81708732241821        4.17672974563975        3.48667572082062     
   2.85849299603507        2.25737280037627     
  -5.76612113467965       -5.95391843710892       -6.03222804182473     
  -6.11399457984994       -6.16008411323567       -6.10113478046776     
  -6.09852606505533       -6.08302896566445     
 -8.466388625857279E-003  0.000000000000000E+000
   1.00996859690757       0.000000000000000E+000
   1.01434705368759       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
