         180           8
   6.25256523167874        5.43090653219849        4.82361945944261     
   4.23639777525519        3.57371226338751        2.95815627599743     
   2.34709238962882        1.67036189259356     
  -4.88512146722802       -5.46854737822986       -5.73713729786371     
  -5.55815190594897       -5.42778871532337       -5.28743895781376     
  -5.21296329057652       -5.50104488576350     
 -8.385759796804788E-003  0.000000000000000E+000
   1.00906330444275       0.000000000000000E+000
   1.01349983689264       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
