         180           8
   1.33147744518815        1.12323877218364       0.874933258718993     
  0.655838119919637       0.363230417826074       7.860075280011740E-002
 -1.940256342007870E-002 -1.956926140027869E-002
  -6.89059385071116       -6.74963966946773       -6.49299023774129     
  -6.33092653090577       -6.43217035851457       -6.65507806083120     
  -6.68029964923072       -6.64379286669608     
 -8.200959371311494E-003  0.000000000000000E+000
   1.00956787051258       0.000000000000000E+000
   1.01431049205025       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
