         180           8
  -2.41993120362796       -2.61845083866027       -2.80949910417253     
  -3.03334031265440       -3.28400911436362       -3.47440191063103     
  -3.62346256121362       -3.60472810837708     
  -6.03753071997081       -5.96332236709900       -5.94547489706669     
  -5.84656886925075       -5.73362729640141       -5.68521063972657     
  -5.61945430809021       -5.61318256916384     
 -8.399934281747248E-003  0.000000000000000E+000
   1.00956950801345       0.000000000000000E+000
   1.01418630973831       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
