         180           8
  -2.77301952684157       -2.84483214250207       -2.96186022035441     
  -3.13163721372444       -3.40010894211008       -3.81598643754209     
  -4.15088161500887       -4.27191335094127     
  -6.09502190843107       -5.94054410823080       -6.08298148710286     
  -6.18109925265652       -6.10018102329771       -6.09572308181437     
  -6.07761686033740       -5.97902444447143     
 -8.459566995306441E-003  0.000000000000000E+000
   1.00944309041454       0.000000000000000E+000
   1.01350117978864       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
