         180           3
   8.12746260876860        6.31609421490571        5.91779716258772     
  -7.48019303349009       -5.88872013864672       -6.43477130718894     
  1.213656011911740E-003  0.000000000000000E+000
  0.987235786211258       0.000000000000000E+000
  0.984721878365730       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
