         180           8
 -0.624767696435063      -0.991110893925260       -1.25669217100901     
  -1.22871582123663       -1.28209490785743       -1.43846565550884     
  -1.56896741573250       -1.61938883025888     
  -6.09359109101521       -6.41343659495667       -6.56069179748570     
  -6.42307072598304       -6.32449967894820       -6.17693395901816     
  -5.94326423954968       -5.97220788738976     
 -8.269488742070612E-003  0.000000000000000E+000
   1.00915074798963       0.000000000000000E+000
   1.01395668297187       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
