         180           8
   3.02929852603107        2.61801423937486        2.22213220483172     
   1.81922688432400        1.60659188276391        1.45211158791547     
   1.18618950503394        1.15728055098486     
  -6.53858655386753       -6.67533813413853       -6.92765617488298     
  -7.11581789584012       -7.11344879279072       -7.01105470396099     
  -6.90641978530710       -6.79931828991531     
 -8.141861254417434E-003  0.000000000000000E+000
   1.00941501391899       0.000000000000000E+000
   1.01390601350234       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
