         180           8
 -0.126739634263058      -0.519981628017554      -0.805433254743950     
  -1.05878273497772       -1.29971906463430       -1.57605013677058     
  -1.78406536213001       -1.86445703687633     
  -5.80465376706665       -5.72542385596682       -5.68725934138620     
  -5.62644546673192       -5.57114700753483       -5.57219751205407     
  -5.53168421182608       -5.45334090517820     
 -8.272561147962766E-003  0.000000000000000E+000
   1.00921979388110       0.000000000000000E+000
   1.01379778143883       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
