         180           8
   4.19524234774921        3.88314882710365        3.53372894151416     
   3.19996202377902        2.87423848590569        2.57259648808658     
   2.30500883480685        2.07463921571830     
  -6.88932161999683       -6.81044914171831       -6.72612068911735     
  -6.64997364315938       -6.54103750359054       -6.43328568070757     
  -6.40632549940220       -6.67607797676235     
 -8.175906020271347E-003  0.000000000000000E+000
   1.00941527592030       0.000000000000000E+000
   1.01380806384971       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
