         180           8
  9.908880843257493E-003 -0.481594442618470      -0.872434116067351     
  -1.21401448735509       -1.61258711907777       -2.31018873976149     
  -2.92592454764979       -3.05092915638865     
  -4.49404774887486       -4.43575835960378       -4.37864953112665     
  -4.28289814997126       -4.30889144126564       -4.91100372112836     
  -5.61987334685023       -5.53207792636946     
 -8.316084858160183E-003  0.000000000000000E+000
   1.00904219333378       0.000000000000000E+000
   1.01342482670550       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
