         180           8
   6.13849139430110        5.91659694241855        5.68931231200626     
   5.52751368808059        5.33638669268669        5.11365299126353     
   4.93551814131466        4.75037544380287     
  -6.72749203151620       -6.71479656671990       -6.51322707722996     
  -6.22363480946002       -6.02540869094561       -5.84933679889277     
  -5.72181808478185       -5.65617701739468     
 -8.231311108840683E-003  0.000000000000000E+000
   1.00918017758175       0.000000000000000E+000
   1.01396134918810       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
