         180           8
   5.24747459562136        5.03271969946164        4.86410967966304     
   4.68651326815853        4.53061623771694        4.40120709558977     
   4.32859528532555        4.23121165593995     
  -6.36292617497275       -6.21738233481435       -6.06970210380260     
  -5.94995604267984       -5.85138811181903       -5.62255841241257     
  -5.29674209662680       -5.01292344811927     
 -8.365319757777833E-003  0.000000000000000E+000
   1.00939129682930       0.000000000000000E+000
   1.01394093371137       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
