         180           8
   4.05351845481543        3.86152315211444        3.65400842169164     
   3.45964755944693        3.32283004398773        3.20676060433417     
   3.10141877567471        2.99374661422703     
  -6.70506040503817       -6.52988950993123       -6.45093775542159     
  -6.37188799679467       -6.13651046357927       -5.87995157844498     
  -5.66346299804091       -5.48462654899549     
 -8.218301268955298E-003  0.000000000000000E+000
   1.00953177089883       0.000000000000000E+000
   1.01393683350918       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
