         180           8
   4.15297061260623        3.95603108521935        3.82580747983071     
   3.66635546454541        3.50819495758829        3.36415634853671     
   3.27159629809177        3.17597242050853     
  -7.38380489260849       -7.17247993676015       -6.89881855995642     
  -6.68780180479880       -6.52097670041206       -6.43814736714887     
  -6.29398277872183       -6.07960496368813     
 -8.336790142000805E-003  0.000000000000000E+000
   1.00933065386755       0.000000000000000E+000
   1.01366900769306       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
