         180           3
   15.4613885952479        12.1878527837300        10.0442753607567     
  -4.40485757482280       -4.55279825690990       -4.46768523443608     
  1.563519292651865E-003  0.000000000000000E+000
  0.987183900092312       0.000000000000000E+000
  0.984634211135734       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
