         180           8
   7.90378603419693        7.17501592181844        6.54602769780707     
   5.90975709548418        5.23982102262220        4.58541178692887     
   3.98291520133787        3.38833915088869     
  -4.80416993421510       -5.03788692319069       -5.21667044860783     
  -5.43268421649472       -5.42764405662889       -5.39771613775121     
  -5.46218005951391       -5.56045809362818     
 -8.379327850656934E-003  0.000000000000000E+000
   1.00972020235668       0.000000000000000E+000
   1.01384507266396       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
