         180           3
   7.49209666218035        9.24024334264015        10.3995588403768     
  -6.87510429045669       -6.49406607917431       -4.19069570300264     
  1.310180177609471E-003  0.000000000000000E+000
  0.986565782711071       0.000000000000000E+000
  0.983965442075293       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
