         180           8
   2.30659403507464        2.17806326487808        2.04201969298845     
   2.04158671676441        1.98291205505118        1.90330559337393     
   1.78494303775430        1.55483320016232     
  -5.60197787366349       -5.65044472143835       -5.78477132952824     
  -5.67845636216998       -5.31705566897235       -5.05390908577735     
  -4.97884752969268       -4.82449975146173     
 -8.199064645590609E-003  0.000000000000000E+000
   1.00951238907676       0.000000000000000E+000
   1.01414905395735       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
