         180           8
   4.21370547733162        3.60852598970422        3.27980722067504     
   2.90846633082918        2.56984695092049        2.27153800697986     
   1.99899400493535        2.18534148150605     
  -7.42696063314517       -7.40381277227514       -7.27761272450866     
  -7.20554353231022       -7.10144639917501       -7.07416132877291     
  -7.24150674440867       -7.69022302363835     
 -7.967670586718623E-003  0.000000000000000E+000
   1.00930920837542       0.000000000000000E+000
   1.01390541792686       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
