         180           8
   8.91068394015466        7.90315707028488        7.28292471691715     
   6.62280077826801        5.88059709493400        5.26689589189587     
   4.70771438297284        4.27926920497741     
  -1.58414104463805       -3.45143857916534       -4.84744223654262     
  -5.52229362161715       -5.95655084903675       -6.25355833268461     
  -6.57302776536742       -6.87002675118854     
 -9.139365519131026E-003  0.000000000000000E+000
   1.01015671505587       0.000000000000000E+000
   1.01408669052106       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
