         180           8
   7.42539943688475        6.80830241863285        6.21316416751966     
   5.59832570829522        4.93792297942368        4.32546818315240     
   3.76401228940099        3.29510819386725     
  -6.63375396806081       -6.81762933053115       -6.86456189889793     
  -6.79785126221552       -6.82349544377254       -6.82716482420574     
  -6.77854143660219       -6.76869249984216     
 -8.977149263424201E-003  0.000000000000000E+000
   1.00950705676027       0.000000000000000E+000
   1.01380281114175       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
