         180           8
   5.83586088807877        5.69516825424130        5.57568650053815     
   5.42664810702869        5.29800558014131        5.16133712963255     
   5.03221186068165        4.97369623075299     
  -8.98593450999582       -9.12900703556260       -9.04129811959147     
  -8.85122408906543       -8.62484268777381       -8.45328188699678     
  -8.29919361830158       -8.07232328793609     
 -8.974285611128955E-003  0.000000000000000E+000
   1.00950723393872       0.000000000000000E+000
   1.01410510592598       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
