         180           3
   14.1498633241487        11.9974857362132        10.3038756909285     
  -5.24351427987319       -5.43827538095244       -5.33591588662534     
  1.085101244649200E-003  0.000000000000000E+000
  0.987201351983609       0.000000000000000E+000
  0.984593781416830       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
