         180           8
   9.80347644604398        9.12730020970139        8.46682151278901     
   7.80369320521724        7.14832302335410        6.48174991524153     
   5.86187029902900        5.21940695267160     
  -6.99145780746689       -7.22666294866494       -7.32117096246797     
  -7.33474579964166       -7.35396585480722       -7.39555554292820     
  -7.50863401883800       -7.60982133079598     
 -9.265275916256312E-003  0.000000000000000E+000
   1.00972000171057       0.000000000000000E+000
   1.01354071171474       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
