         180           8
   6.50852075777675        6.06974458306953        5.71119628764191     
   5.40821850869718        5.10726473447404        4.85820639723755     
   4.63582617196580        4.64503932753088     
  -7.98053907256116       -8.16993084097567       -8.28673729667674     
  -8.35107087806442       -8.39169852839909       -8.46493105575049     
  -8.54248878687919       -8.26582804624330     
 -8.922273316261324E-003  0.000000000000000E+000
   1.00907619681860       0.000000000000000E+000
   1.01310375517861       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
