         180           8
   6.69120088176375        6.36879789677940        6.08423424570964     
   5.85194179678873        5.71568381350354        5.69987575034702     
   5.49935745170211        5.29353655040054     
  -8.81677345540373       -8.73761950655495       -8.66678843738850     
  -8.61513618446079       -8.60661903367724       -8.59026258964307     
  -8.52500100178417       -8.51065423330719     
 -8.926280691740082E-003  0.000000000000000E+000
   1.00920271735350       0.000000000000000E+000
   1.01353962430240       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
